[item_ga_medkit_hud] 
hands_position				= 0.0,-0.025,0.12
hands_orientation			= 0.0,0.0,0.0
hands_position_16x9			= 0.0,-0.025,0.12
hands_orientation_16x9		= 0.0,0.0,0.0
hud_fov                     = 0.80
item_visual             	= dynamics\aptechki\medkit_hud
anm_ea_show					= med, med

[item_ga_medkit_army_hud]:item_ga_medkit_hud
item_visual             	= dynamics\aptechki\medkit_hud

[item_ga_medkit_scientic_hud]:item_ga_medkit_hud
item_visual             	= dynamics\aptechki\medkit_hud

[item_ga_medkit_elite_hud]:item_ga_medkit_hud
item_visual             	= dynamics\aptechki\medkit_hud

[item_ga_syringe_def_hud]:item_ga_medkit_hud
item_visual             	= dynamics\aptechki\medkit_hud
anm_ea_show					= med, med

[item_ga_syringer_guns_hud]:item_ga_medkit_hud
item_visual             	= dynamics\aptechki\medkit_hud
anm_ea_show					= med, med

