; **** DO NOT MODIFY THIS FILE ****
;
; To customize signal sources, create a file 
; named "rfsrc_<yourname>.ltx" and place it 
; in this folder. NERFS will attempt to load 
; any file named in that pattern.
;
#include "rfsrc_*.ltx"
