; This set is intended to contain body 
; markers for integration with the Milspec
; PDA addon's Kill Tracker. Feel free to 
; customize the icon list.
; 
; If you are never going to use PAW with 
; MilPDA, you can safely delete this file.

[iconset_bodies]
name			= ui_mcm_lst_pawsys_pg_bodies
default 		= death_small

[bodies_icons]
death_small
blue_circle
crosshair_white
crosshair_red
crosshair_green
mpda_white_x
mpda_skull
mpda_bluedot_sm
mpda_bluedot_md
mpda_bluedot_lg
redskull
