[item_surgerykit_hud] 
hud_fov                     = 0.6

hands_position				= 0, 0, 0
hands_orientation			= 0, 0, 0
hands_position_16x9			= 0, 0, 0
hands_orientation_16x9		= 0, 0, 0
item_visual             	= dynamics\bints\liz_surgerykit
anm_ea_show				    = liz_surgerykit_use_hands, liz_surgerykit_use