![pripyat]
	ano_out_63                        = gravitational, -224.18188476562, -0.50922667980194, 178.74562072754, 139163, 4953
	ano_out_64                        = gravitational, -259.46499633789, -0.5073835849762, 177.55630493164, 139163, 4953
	ano_out_66                        = gravitational, -243.07150268555, -0.51166599988937, 200.50714111328, 139163, 4953
	ano_out_67                        = gravitational, -230.43310546875, -0.51105439662933, 192.22436523438, 139163, 4953 
	ano_out_68                        = gravitational, -216.12675476074, -0.50813782215118, 195.74899291992, 139163, 4953
	ano_out_69                        = gravitational, -252.77267456055, -0.51104891300201, 201.49604797363, 139163, 4953
	ano_out_71                        = gravitational, -249.85397338867, -0.5162752866745, 193.83493041992, 139163, 4953
	ano_out_72                        = gravitational, -243.80207824707, -0.51745474338531, 182.23947143555, 139163, 4953
	ano_out_73                        = gravitational, -249.40621948242, -0.506915807724, 176.8842010498, 139163, 4953
	ano_out_74                        = gravitational, -253.56851196289, -0.50707471370697, 184.23204040527, 139163, 4953
	ano_out_75                        = radioactive, -231.63369750977, -0.51084101200104, 179.14846801758, 139163, 4953
	ano_out_76                        = radioactive, -259.68908691406, -0.50873965024948, 131.52262878418, 139163, 4953
	ano_out_77                        = radioactive, -257.29971313477, -0.51722353696823, 87.403793334961, 139163, 4953
	ano_out_78                        = radioactive, -263.29000854492, -0.33534646034241, 70.815391540527, 139163, 4953
	ano_out_79                        = radioactive, -277.66217041016, -0.51174032688141, 89.237686157227, 139163, 4953
	ano_out_81                        = radioactive, -263.36688232422, -0.51130557060242, 29.711553573608, 139163, 4953
	ano_out_82                        = radioactive, -175.14212036133, -0.14185057580471, 98.400108337402, 139163, 4953
	ano_out_83                        = radioactive, -110.54473876953, -0.50893080234528, 177.62989807129, 139163, 4953
	ano_out_84                        = radioactive, -65.76587677002, -0.51381301879883, 272.89999389648, 138502, 4953
	ano_out_85                        = radioactive, -107.99384307861, -0.50714510679245, 273.70297241211, 138502, 4953
	ano_out_86                        = radioactive, -136.16583251953, -0.50732499361038, 276.22647094727, 138502, 4953
	ano_out_87                        = radioactive, -197.52235412598, -0.51093280315399, 273.26422119141, 138502, 4953
	ano_out_88                        = thermal, -218.07049560547, -0.27947947382927, 115.23447418213, 139163, 4953
	ano_out_89                        = thermal, -203.58360290527, 0.11234119534492, 140.59504699707, 139163, 4953
	ano_out_100                       = thermal, -179.95834350586, 0.86090469360352, 140.67945861816, 139163, 4953
	ano_out_101                       = thermal, -164.67227172852, 0.5711385011673, 126.14208984375, 139163, 4953
	ano_out_102                       = thermal, -151.40969848633, 0.33085477352142, 141.61424255371, 139163, 4953
	ano_out_103                       = thermal, -130.27326965332, -0.86236977577209, 198.43109130859, 139163, 4953
	ano_out_104                       = thermal, -112.09100341797, -1.1547974348068, 213.15454101562, 139163, 4953
	ano_out_105                       = thermal, -100.7456817627, -1.5330946445465, 235.33918762207, 139163, 4953
	ano_out_106                       = thermal, -118.39884185791, -1.8302018642426, 229.6782989502, 139163, 4953
	ano_out_107                       = thermal, -193.71012878418, 0.064363986253738, 205.50401306152, 139163, 4953
	ano_out_108                       = electric, -144.23762512207, -0.54982697963715, 241.49221801758, 139165, 4953
	ano_out_109                       = electric, -147.70915222168, -0.5310150384903, 242.0783996582, 139166, 4953
	ano_out_110                       = electric, -144.49186706543, -0.50692170858383, 244.61000061035, 139170, 4953
	ano_out_111                       = electric, -145.93083190918, 2.5554811954498, 242.90856933594, 139167, 4953
	ano_out_112                       = electric, -237.53533935547, -0.50666224956512, 189.24421691895, 139163, 4953
	ano_out_113                       = electric, -239.00762939453, 0.60318768024445, 187.88969421387, 139163, 4953
	ano_out_114                       = electric, -239.89688110352, -0.51943111419678, 188.69415283203, 139163, 4953

