![k01_darkscape]
        !ano_dsc_42                       = chemical, 429.71731567383, -1.8115394115448, -371.16778564453, 918931, 1404
        !ano_dsc_43                       = chemical, 430.38342285156, -1.8093948364258, -365.34536743164, 920078, 1404
        !ano_dsc_44                       = chemical, 430.41537475586, -1.7958755493164, -361.078125, 920084, 1404