![l01_escape]
	!ano_esc_0                        = gravitational, 17.394336700439, 15.890402793884, 664.333984375, 325647, 567
        !ano_esc_1                        = electric, 16.90838432312, 13.750101089478, 645.50750732422, 324678, 410
        ;ano_esc_102                      = electric, 353.21658325195, 14.934350013733, -29.440731048584, 619686, 370
        ;ano_esc_104                      = electric, 360.93698120117, 14.938066482544, -34.537322998047, 621986, 370
	;ano_esc_107                      = electric, 347.67706298828, 15.098957061768, -33.032413482666, 617446, 621
        ;ano_esc_108                      = electric, 363.38165283203, 14.933527946472, -42.13053894043, 622485, 370
	;ano_esc_110                      = electric, 371.09335327148, 20.946316719055, -42.225631713867, 623728, 370
	;ano_esc_111                      = electric, 350.76919555664, 20.918435096741, -28.366254806519, 618350, 621
        ;ano_esc_112                      = electric, 357.43197631836, 18.893308639526, -37.717849731445, 621046, 370
        ;ano_esc_113                      = electric, 366.36376953125, 19.936526298523, -38.863098144531, 623079, 370
	;ano_esc_114                      = electric, 369.87814331055, 18.236912536621, -45.690231323242, 623591, 370
	;ano_esc_115                      = electric, 361.81338500977, 20.013339996338, -41.715454101562, 622153, 370
	;ano_esc_116                      = electric, 358.23190307617, 19.9868516922, -39.258373260498, 621237, 370
        ;ano_esc_117                      = electric, 354.18405151367, 18.908493995667, -36.053356170654, 619925, 370
        ;ano_esc_118                      = electric, 354.5426940918, 20.168806648254, -28.844787597656, 619936, 370
	;ano_esc_119                      = electric, 357.6321105957, 20.212746810913, -34.094421386719, 621051, 370
        ;ano_esc_109                     = electric, 367.34536743164, 14.929558753967, -38.927028656006, 623318, 370
        ;ano_esc_105                     = electric, 362.48791503906, 14.984031677246, -40.222038269043, 622327, 370
        ;ano_esc_106                     = electric, 370.05667114258, 14.978092193604, -40.198169708252, 623666, 370
	;ano_esc_103                     = electric, 356.25527954102, 15.888303756714, -36.900623321533, 620636, 370