![l06_rostok]
	ano_ros_63                        = gravitational, -161.3055267334, -0.002201646566391, 48.760059356689, 25377, 1908
	ano_ros_64                        = gravitational, -158.25860595703, -0.0015027523040771, 56.189792633057, 25377, 1908
	ano_ros_66                        = gravitational, -168.89785766602, -0.0030859410762787, 54.516521453857, 25377, 1908
	ano_ros_67                        = radioactive, -163.63726806641, -0.00087732076644897, 52.27965927124, 25377, 1908 
	ano_ros_68                        = chemical, -155.56665039062, 0.29411315917969, 80.926223754883, 25377, 1908
	ano_ros_69                        = chemical, -154.25556945801, 0.09965255856514, 84.569267272949, 25377, 1908
	ano_ros_71                        = thermal, -182.62310791016, -0.0011163353919983, 40.366508483887, 25377, 1908
	ano_ros_72                        = thermal, -184.66575622559, -0.0023784041404724, 35.73189163208, 25377, 1908
	ano_ros_73                        = thermal, -180.48937988281, -0.0046562254428864, 34.8095703125, 25377, 1908
	ano_ros_74                        = thermal, -178.43943786621, -0.0021621137857437, 30.777183532715, 25377, 1908
	ano_ros_75                        = thermal, -174.39161682129, -0.00010567903518677, 29.51441192627, 25377, 1908
	ano_ros_76                        = thermal, -175.04580688477, -0.00018487870693207, 24.866413116455, 25377, 1908
	ano_ros_77                        = thermal, -171.47622680664, -0.0003587007522583, 22.60669708252, 25377, 1908
	ano_ros_78                        = thermal, -172.79882812532, -0.0025824904441833, 17.576650619507, 25377, 1908
	ano_ros_79                        = thermal, -178.30107116699, -7.002055644989e-05, 18.065408706665, 25377, 1908
	ano_ros_81                        = thermal, -179.49899291992, -0.00028195977210999, 13.813373565674, 25377, 1908
	ano_ros_82                        = thermal, -183.74478149414, -0.00024449825286865, 11.809941291809, 25377, 1908
	ano_ros_83                        = thermal, -185.39465332031, -0.0046873688697815, 16.391710281372, 25377, 1908
	ano_ros_84                        = thermal, -189.64587402344, -0.0048295259475708, 18.243629455566, 25377, 1908
	ano_ros_85                        = thermal, -187.56173706055, -0.00028896331787109, 21.857831954956, 25377, 1908
	ano_ros_86                        = thermal, -187.80061340332, -0.0033606588840485, 26.730026245117, 25377, 1908
	ano_ros_87                        = thermal, -192.21124267578, -0.00092019140720367, 24.20227432251, 25377, 1908
	ano_ros_88                        = thermal, -187.70239257812, -0.00086730718612671, 3.3345000743866, 25377, 1908
	ano_ros_89                        = thermal, -199.66918945312, -0.0038188099861145, -3.3506965637207, 24738, 1908
	ano_ros_100                       = thermal, -196.65022277832, -0.0052649974822998, -13.183561325073, 24738, 1908
	ano_ros_101                       = thermal, -206.28680419922, -0.002912163734436, -17.364234924316, 24738, 1908
	ano_ros_102                       = thermal, -202.99934387207, -0.00026543438434601, -23.17338180542, 24738, 1908
	ano_ros_103                       = thermal, -210.53144836426, -0.00023095309734344, -26.060640335083, 24384, 1908
	ano_ros_104                       = thermal, -173.76370239258, -0.00047957897186279, 15.20398235321, 25377, 1908
	ano_ros_105                       = thermal, -194.13003540039, -0.0020697414875031, 22.966623306274, 25377, 1908
	ano_ros_106                       = thermal, -190.26966857910, -0.00043398141860962, 30.282733917236, 25377, 1908
	ano_ros_107                       = thermal, -179.65838623047, -0.0012353509664536, 11.232748031616, 25377, 1908
	ano_ros_108                       = thermal, -181.71868896484, -0.00027760863304138, 18.718341827393, 25377, 1908
	ano_ros_109                       = thermal, -188.67903137207, -0.00048862397670746, 35.557014465332, 25377, 1908
	ano_ros_110                       = thermal, -194.61724853516, -0.0035153031349182, 22.132669448853, 25377, 1908
	ano_ros_111                       = thermal, -190.24580383301, -0.00033354759216309, 30.191970825195, 25377, 1908
	ano_ros_112                       = thermal, -182.59356689453, -0.0027606934309006, 26.000076293945, 25377, 1908
	ano_ros_113                       = radioactive, -167.48039245605, -0.0019214451313019, 73.26441192627, 25377, 1908
	ano_ros_114                       = radioactive, -158.01057434082, -0.0053507536649704, 90.500900268555, 25377, 1908
	ano_ros_115                       = radioactive, -146.17025756836, -0.0037648975849152, 111.64415740967, 25377, 1908
