;Базовый бинт

[item_ga_bandage_hud] 
hands_position				= 0,-0.11,0.17
hands_orientation			= 0,20,0
hands_position_16x9			= 0,-0.11,0.17
hands_orientation_16x9		= 0,20,0
item_visual             	= dynamics\bints\bandage_hud
anm_ea_show				    = bint, bint
hud_fov                     = 0.9


;Израильский бинт

[item_ga_bandage_israeli_hud]:item_ga_bandage_hud
hands_position				= 0,-0.11,0.17
hands_orientation			= 0,20,0
hands_position_16x9			= 0,-0.11,0.17
hands_orientation_16x9		= 0,20,0
item_visual             	= dynamics\bints\bandage_hud
anm_ea_show				    = bint, bint
hud_fov                     = 0.9


;Био бинт

[item_ga_bio_bandage_hud]:item_gwa_bandage_hud
hands_position				= 0,-0.11,0.17
hands_orientation			= 0,20,0
hands_position_16x9			= 0,-0.11,0.17
hands_orientation_16x9		= 0,20,0
item_visual             	= dynamics\bints\bandage_hud
anm_ea_show				    = bint, bint
hud_fov                     = 0.9